TriNet ShakeMap: Magnitude 5.2

PROCESSED: Mon Feb 25, 2002 11:34:37 AM PST, -- NOT REVIEWED BY HUMAN

SHAKING: WEAK STRONG SEVERE

-116˚ -115˚

32˚

32.5˚

33˚