0.1

0.1

0.1

0.2

0.2

0.3

0.4

CISN Peak Accel. Map (in %g) Epicenter: 7.7 mi SW of Arvin, CA

Sat Nov 1, 2003 06:52:35 AM PST M 3.4 N35.14 W118.94 Depth: 15.5km ID:14000872

PROCESSED: Mon Nov 3, 2003 09:45:41 AM PST, -- NOT REVIEWED BY HUMAN

-120˚ -119˚ -118˚

34.5˚

35˚

35.5˚

0 10 20 30 km