-122˚ -121˚ 36˚

36.5˚

37˚

37.5˚

0.04

0.04

0.04

0.08

0.08

0.12

0.16

CISN Peak Accel. Map (in %g) Epicenter: 4 km NW of Tres Pinos, CA

Thu Sep 25, 2003 07:33:45 AM PDT M 3.5 N36.82 W121.35 ID:51131722

PROCESSED: Thu Sep 25, 2003 04:49:54 PM PDT, -- NOT REVIEWED BY HUMAN

0 10 20 30 km