-119˚ -118˚ -117˚ 35˚

35.5˚

36˚

36.5˚

0.2

0.2

0.2

0.2

0.2

0.4

0.4

0.4

0.4

0.6

0.6

0.8

0.8

TriNet Peak Velocity Map (in cm/s) Epicenter: 4.4 mi SE of Coso Junction, CA

Sat Jul 14, 2001 10:30:28 AM PDT M 4.0 N36.03 W117.89 ID:9671933

PROCESSED: Mon Feb 11, 2002 02:41:15 PM PST, -- NOT REVIEWED BY HUMAN

0 10 20 30 km