-117˚ -116˚

33˚

33.5˚

34˚

0.5

0.5

0.5

1

1

1

1.5

1.5

1.5

2

2

TriNet Peak Accel. Map (in %g) Epicenter: 10 mi. NNW of Borrego Springs, CA

Wed Jan 2, 2002 04:11:28 AM PST M 4.2 N33.38 W116.45 ID:9742277

PROCESSED: Fri Jan 11, 2002 04:51:12 PM PST, -- NOT REVIEWED BY HUMAN

CDMG

0 10 20 30 km