-119˚ -118˚

34˚

34.5˚

35˚

0.4

0.4

0.8

1.2

CISN Peak Accel. Map (in %g) Epicenter: 5 mi W of Valencia, CA

Tue Aug 26, 2003 11:02:22 PM PDT M 3.9 N34.40 W118.65 ID:9941081

PROCESSED: Thu Aug 28, 2003 11:30:26 AM PDT, -- NOT REVIEWED BY HUMAN

0 10 20 30 km