-118˚ -117˚ -116˚

32˚

32.5˚

33˚

0.04

0.04

0.08

0.08

0.12

0.12

0.16

0.2

0.24

CISN Peak Velocity Map (in cm/s) Epicenter: 7 km WSW of San Ysidro, CA

Tue Oct 7, 2003 10:35:50 AM PDT M 3.6 N32.52 W117.11 ID:9949649

PROCESSED: Tue Oct 7, 2003 05:28:28 PM PDT, -- NOT REVIEWED BY HUMAN

0 10 20 30 km