-116˚ -115˚

31.5˚

32˚

32.5˚

33˚

1

1

2

2

3

4

CISN Peak Accel. Map (in %g) Epicenter: 31.4 mi S of Calexico, CA

Wed Oct 8, 2003 04:26:23 AM PDT M 4.3 N32.22 W115.43 ID:9949793

PROCESSED: Wed Oct 8, 2003 08:19:54 AM PDT, -- NOT REVIEWED BY HUMAN

0 10 20 30 km